(a)

-0.4-0.20.20.40.6

Energy (eV)

02000

4000

- Ωz(k) (atomic units)

Γ(0,0,0) H(1,0,0)

P(½,½,½) EF (b)

-0.4-0.20.20.40.6

Energy (eV)

Γ(0,0,0) H(1,0,0)

P(½,½,½)

02000

4000

- Ωz(k) (atomic units)

EF*