-0.3-0.2-0.10.0-0.3-0.2-0.10.0λ=−1λ=0λ=+1

-12-8-404812λ=−1λ=0λ=1-12-8-404812CBDC

PhMDA

PxPz

ΔE(eV/unit cell)

P(μC/cm 2)

Pz