3.84.2Lattice Parameter (Angstrom)

100200300400

Domain wall energy (mJ/m 2)

PTO: DW

TiPZO: DW

ZrPZT: DW

TiPZT: DW

ZrDomain wall energies in PTO, PZO, and PZT