-0.4 -0.3 -0.2 -0.1 0.0 0.1 0.2 0.3 0.4

-0.06

-0.04

-0.02

0.00

0.02

0.04

0.06

-0.05 0.00 0.05

-0.005

0.000

0.005

BC+CB

BS+SB

BS+SC+CB

SC

SB

CB

Interface dipole density (10-10C/m)

Displacement field (C/m2)

BC

BS

CS