3.90

3.92

3.94

3.96

3.98

4.00

4.02

In-plane Lattice Constant (

Å)-0.03

-0.02

-0.01

0.01

Atomic Displacements (cell vectors units)

-15-10-5051015Misfit Strain (10

-3)-0.03

craaΔ3(Ti)Δ3(O1)Δ3(O3)Δ1(Ti)Δ1(O1)Δ2(O1)Δ1(O3)