Instructions for answering multiple choice questions

on the

Student Response System

When the period during which you are supposed to respond begins, the green light should be on. When you enter a single response of an answer from 1 to 5, the answer will be recorded, and the yellow light will come on. If you press a key which is not a valid answer, like 8, the red light will come on and no answer will be counted for you. If you wish to change your answer, pressing the # key will reset your keypad to restart, so you can then enter a number from 1 to 5.

Important: If you press two keys, or even one key twice, without using the # key to erase the first keypress, your answer is considered invalid and is not counted.